                                           inputFile   tjukk wavFile 16bit  mono
                                           time  4177 ms   freq  3953 Hz SampleRate:22000.0 Hz
                                                                         timeAtTheLeft  3770 ms

partFourieGraph

                                            15 % of realMax

                                                                                                                    20 ms
                                           <--- -->

                                                                                     23 ms 22000 (Hz) sample rate