                                           inputFile   myTwks wavFile 8bit  mono
                                           time  1729 ms   freq  2067 Hz SampleRate:44100.0 Hz
                                                                         timeAtTheLeft  0 ms

partFourieGraph

                                            100 % of realMax

20 ms
                                           <--- -->

                                                                                     11 ms 44100 (Hz) sample rate
distance  3600 km cutOffFreq 1722 Hz
height 87km at time: 1745