                                           inputFile   ekeberg wavFile 8bit  mono
                                           time  708 ms   freq  4134 Hz SampleRate:22050.0 Hz
                                                                         timeAtTheLeft  0 ms

partFourieGraph

                                            100 % of realMax

                                                                                                                     20 ms
                                           <--- -->

                                                                                     23 ms 22050 (Hz) sample rate
distance  5041 km cutOffFreq 1528 Hz
height 98km at time: 754