     0

  print
kiruna

                                                    getGrams
                                   updateGram getScaled

                                                                    IPSScaled

                Time of day
addToCircle
clearCircle
stepCircle
fMin
hPrimEs
foEs
TypeEs
fbEs
hPrimE
foE
hPrimF
foF1
hPrimF2
fmI
foF2
fxI
M[3000]
noScaling

                                                                                                                    succGram

                                                                                                    preGram

                                                                    saveScaled

  24 Mar 1999 08:01:01 GMT
ionograms:23 Mar 1999 08:01:01 GMT
scaled     :23 Mar 1999 08:01:01 GMT

                                                                                     scaling/notPolan

                                                                                     getProfileWithPolan saveProfile

                                                                            freq/height-> 8410/333

                                                                              Am ionogram
                                                                                     Kiruna 99 3 23 9 5

                                                                                             noscaling
                                                                                             n profile:0

                              fMin: 17 EE

          hPrimEs: 126

                                  foEs: 23

          TypeEs: H  6Q

                          fbEs: 10 EE

          hPrimE: nil

          foE: nil

          hPrimF: 230

          foF1: nil

          hPrimF2: 314

                                                            fmI: 71

                                                         foF2: 65

                                                            fxI: 71

                                                               MUF:   2.83

                                                               muf[3000]: 18395Khz

MUF