     3

  print
kiruna

                                                    getGrams
                                   updateGram getScaled

                                                                    ordinaryScaled

                Time of day
forAll:

 clearPolan
 addToCircle

 clearCircle

 stepCircle
fMin
hPrimEs
foEs
TypeEs
fbEs
hPrimE
foE
hPrimF
foF1
hPrimF2
fmI
foF2
fxI
M[3000]
noScaling

                                                                                                                    succGram

                                                                                                    preGram

                                                                    saveScaled

  16 Jan 2003 09:54:30 GMT
ionograms:26 Nov 2002 08:33:33 GMT
scaled     :19 Dec 2002 09:54:30 GMT

                                                                                     scaling/notPolan

                                                                                     getProfileWithPolan saveProfilesAsOneFile
                                                                                                                saveProfileAsFiles

                          null 0

                                                                            freq/height-> 2560/867

                                                                              Pm ionogram
                                                                                     kiruna 2 11 26 13 5