Grams printedOn: Christers at time: Tue Aug 13 11:17:27 1996

Ki 96 08 12 00 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 01 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 02 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 03 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 04 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 05 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 06 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 07 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 08 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 09 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 10 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 11 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 12 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 13 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 14 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 15 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 16 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 17 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 18 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 19 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 20 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 21 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 22 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km

Ki 96 08 12 23 05 36

Kiruna Ionogram numFreq:500

1000 0 KHz 15970

800

km